| < 1) labη(|_{ch}N

0 50 100 150 200

2v

0 0.02

0.04

0.06

0.08 0.1 0.12

c < 3.0 GeV/ Tp 0.2 <

| > 1.4} ηΔ {2, | 2v {4} 2v

= 5.02 TeV NNs ALICE p-Pb

| < 1) labη(|_{ch}N

10^210^310

2v

0 0.02

0.04

0.06

0.08 0.1 0.12

| > 1.4} ηΔ {2, | 2v {4} 2v {6} 2v

82 65 52 43 31 17 7

Centrality (%)

c < 3.0 GeV/ Tp 0.2 <

= 2.76 TeV NNs ALICE Pb-Pb